INPUT/OUTPUT MODE - F4 DEFAULTS                                 EZCHV016.HLP
═══════════════════════════════════════════════════════════════════════════════
    Data Path:Data drive and path where your files are to be read and saved.
     Dir Mask:The directory mask used to look up files when the space bar
              feature is used for File Name.

    Box Width:The initial figure width in columns.
   Box Height:The initial figure height in rows.
Move Scrn-L/R:The number of columns the screen moves when Ctrl-left or
              Ctrl-right is pressed.
Move Scrn-U/D:The number of rows the screen moves when Ctrl-PgUp or
              Ctrl-PgDn is pressed.
  -Compressed:Y= print at 17 characters per inch.
  -Overstrike:Y= prints each line twice.
-Lines / Inch:The number of lines printed per verticle inch, 6 or 8.
-Setup String:A string of code to be sent to the printer before printing the
              workspace.
-Line Numbers:Y= print a line number to the left of each line.
 -Left Margin:The number of characters to leave blank before each line.
-Lines / Page:The number of lines that can print on a page of paper.
   -ASCII Ext:N= use characters "-" and ":" for printing lines.
Color Monitor:Y= use color.
         Bell:Y= use an audible alarm.
